伟易博(中国区)官方网站
/ Home
/ About CTG
/ Green Life
/ Business
/ News & Media
/ Sustainability
伟易博(中国区)官方网站
Chinese
English
伟易博(中国区)官方网站
伟易博(中国区)官方网站

World’s largest clean energy corridor achieves record peak output of 70 mln kW

Date: 2024-08-13

Amid soaring temperatures and surging electricity demand across China, the world's largest clean energy corridor along the main stream of the Yangtze River had a record peak output of over 70 million kilowatts on July 31.

In particular, the Baihetan Hydropower Station along the corridor recorded an output of 16 million kilowatts, operating at full capacity for the first time since its launch.

The clean energy corridor comprises six cascade hydropower stations operated by CTG. As China is currently at a critical stage of flood control and navigating peak power demand, CTG will keep boosting clean energy supply while ensuring flood safety to meet people's needs for electricity.

All Copyrigh

By China Three Gorges Corporation

Reprinting or mirroring is strictly prohibited without written authorization,

and offenders will be held liable.

World’s largest clean energy corridor achieves record peak output of 70 mln kW

Date: 2024-08-13

Amid soaring temperatures and surging electricity demand across China, the world's largest clean energy corridor along the main stream of the Yangtze River had a record peak output of over 70 million kilowatts on July 31.

In particular, the Baihetan Hydropower Station along the corridor recorded an output of 16 million kilowatts, operating at full capacity for the first time since its launch.

The clean energy corridor comprises six cascade hydropower stations operated by CTG. As China is currently at a critical stage of flood control and navigating peak power demand, CTG will keep boosting clean energy supply while ensuring flood safety to meet people's needs for electricity.

All Copyrigh

By China Three Gorges Corporation

Reprinting or mirroring is strictly prohibited without written authorization,

and offenders will be held liable.

Contact Us
Address :No. 1 Liuhe Road, Jiang'an District, Wuhan City, Hubei Province, China
伟易博(中国区)官方网站

Site Map

Link

Copyright 2022-2026 - China Three Gorges Corporation. All rights reserved.
伟易博(中国区)官方网站
伟易博(中国区)官方网站
Copyright 2022-2026 - China Three Gorges Corporation.
【网站地图】【sitemap】