伟易博(中国区)官方网站
/ Home
/ About CTG
/ Green Life
/ Business
/ News & Media
/ Sustainability
伟易博(中国区)官方网站
Chinese
English
伟易博(中国区)官方网站
伟易博(中国区)官方网站
Home Bussiness Clean Energy Wind Power
Kangbao Wind Farm

The farm is a supplementary VSC-HVDC transmission project for the Beijing 2022 Winter Olympics, and is a crucial power source for the ±500KV VSC-HVDC transmission project in Zhangbei County, Hebei Province. It plays a significant role in utilizing clean energy, enhancing air quality, optimizing the power supply structure, and enabling a green Winter Olympics.

Clean Energy

Kangbao Wind Farm

The farm is a supplementary VSC-HVDC transmission project for the Beijing 2022 Winter Olympics, and is a crucial power source for the ±500KV VSC-HVDC transmission project in Zhangbei County, Hebei Province. It plays a significant role in utilizing clean energy, enhancing air quality, optimizing the power supply structure, and enabling a green Winter Olympics.

Contact Us
Address :No. 1 Liuhe Road, Jiang'an District, Wuhan City, Hubei Province, China
伟易博(中国区)官方网站

Site Map

Link

Copyright 2022-2026 - China Three Gorges Corporation. All rights reserved.
伟易博(中国区)官方网站
伟易博(中国区)官方网站
Copyright 2022-2026 - China Three Gorges Corporation.
【网站地图】【sitemap】